<template>
  <NuxtLink
    class="contents"
    :to="status === 'suspended' ? '' : `/servers/manage/${props.server_id}`"
  >
    <div
      v-tooltip="
        status === 'suspended'
          ? suspension_reason === 'upgrading'
            ? 'This server is being transferred to a new node. It will be unavailable until this process finishes.'
            : 'This server has been suspended. Please visit your billing settings or contact Modrinth Support for more information.'
          : ''
      "
      class="flex cursor-pointer flex-row items-center overflow-x-hidden rounded-3xl bg-bg-raised p-4 transition-transform duration-100"
      :class="status === 'suspended' ? '!rounded-b-none opacity-75' : 'active:scale-95'"
      data-pyro-server-listing
      :data-pyro-server-listing-id="server_id"
    >
      <UiServersServerIcon v-if="status !== 'suspended'" :image="image" />
      <div
        v-else
        class="bg-bg-secondary flex size-24 items-center justify-center rounded-xl border-[1px] border-solid border-button-border bg-button-bg shadow-sm"
      >
        <LockIcon class="size-20 text-secondary" />
      </div>
      <div class="ml-8 flex flex-col gap-2.5">
        <div class="flex flex-row items-center gap-2">
          <h2 class="m-0 text-xl font-bold text-contrast">{{ name }}</h2>
          <ChevronRightIcon />
        </div>

        <div
          v-if="projectData?.title"
          class="m-0 flex flex-row items-center gap-2 text-sm font-medium text-secondary"
        >
          <Avatar
            :src="iconUrl"
            no-shadow
            style="min-height: 20px; min-width: 20px; height: 20px; width: 20px"
            alt="Server Icon"
          />
          Using {{ projectData?.title || 'Unknown' }}
        </div>
        <div v-else class="min-h-[20px]"></div>

        <div
          v-if="isConfiguring"
          class="flex min-w-0 items-center gap-2 truncate text-sm font-semibold text-brand"
        >
          <SparklesIcon class="size-5 shrink-0" /> New server
        </div>
        <UiServersServerInfoLabels
          v-else
          :server-data="{ game, mc_version, loader, loader_version, net }"
          :show-game-label="showGameLabel"
          :show-loader-label="showLoaderLabel"
          :linked="false"
          class="pointer-events-none flex w-full flex-row flex-wrap items-center gap-4 text-secondary *:hidden sm:flex-row sm:*:flex"
        />
      </div>
    </div>
    <div
      v-if="status === 'suspended' && suspension_reason === 'upgrading'"
      class="relative -mt-4 flex w-full flex-row items-center gap-2 rounded-b-3xl bg-bg-blue p-4 text-sm font-bold text-contrast"
    >
      <UiServersPanelSpinner />
      Your server's hardware is currently being upgraded and will be back online shortly.
    </div>
    <div
      v-else-if="status === 'suspended' && suspension_reason === 'cancelled'"
      class="relative -mt-4 flex w-full flex-col gap-2 rounded-b-3xl bg-bg-red p-4 text-sm font-bold text-contrast"
    >
      <div class="flex flex-row gap-2">
        <UiServersIconsPanelErrorIcon class="!size-5" /> Your server has been cancelled. Please
        update your billing information or contact Modrinth Support for more information.
      </div>
      <CopyCode :text="`${props.server_id}`" class="ml-auto" />
    </div>
    <div
      v-else-if="status === 'suspended' && suspension_reason"
      class="relative -mt-4 flex w-full flex-col gap-2 rounded-b-3xl bg-bg-red p-4 text-sm font-bold text-contrast"
    >
      <div class="flex flex-row gap-2">
        <UiServersIconsPanelErrorIcon class="!size-5" /> Your server has been suspended:
        {{ suspension_reason }}. Please update your billing information or contact Modrinth Support
        for more information.
      </div>
      <CopyCode :text="`${props.server_id}`" class="ml-auto" />
    </div>
    <div
      v-else-if="status === 'suspended'"
      class="relative -mt-4 flex w-full flex-col gap-2 rounded-b-3xl bg-bg-red p-4 text-sm font-bold text-contrast"
    >
      <div class="flex flex-row gap-2">
        <UiServersIconsPanelErrorIcon class="!size-5" /> Your server has been suspended. Please
        update your billing information or contact Modrinth Support for more information.
      </div>
      <CopyCode :text="`${props.server_id}`" class="ml-auto" />
    </div>
  </NuxtLink>
</template>

<script setup lang="ts">
import { ChevronRightIcon, LockIcon, SparklesIcon } from '@modrinth/assets'
import { Avatar, CopyCode } from '@modrinth/ui'
import type { Project, Server } from '@modrinth/utils'

import { useModrinthServers } from '~/composables/servers/modrinth-servers.ts'

const props = defineProps<Partial<Server>>()

if (props.server_id && props.status === 'available') {
  // Necessary only to get server icon
  await useModrinthServers(props.server_id, ['general'])
}

const showGameLabel = computed(() => !!props.game)
const showLoaderLabel = computed(() => !!props.loader)

let projectData: Ref<Project | null>
if (props.upstream) {
  const { data } = await useAsyncData<Project>(
    `server-project-${props.server_id}`,
    async (): Promise<Project> => {
      const result = await useBaseFetch(`project/${props.upstream?.project_id}`)
      return result as Project
    },
  )
  projectData = data
} else {
  projectData = ref(null)
}

const image = useState<string | undefined>(`server-icon-${props.server_id}`, () => undefined)
const iconUrl = computed(() => projectData.value?.icon_url || undefined)
const isConfiguring = computed(() => props.flows?.intro)
</script>
