# phpMyAdmin MySQL-Dump
# version 2.2.1
# http://phpwizard.net/phpMyAdmin/
# http://phpmyadmin.sourceforge.net/ (download page)
#
# Host: bonsai2
# Generation Time: Feb 12, 2002 at 10:02 PM
# Server version: 3.23.46
# PHP Version: 4.0.3pl1
# Database : `bonsai`

#
# Dumping data for table `mh_command`
#

INSERT INTO `mh_command` VALUES (1, 'run');
INSERT INTO `mh_command` VALUES (2, 'pause');
INSERT INTO `mh_command` VALUES (3, 'exit');

